Persebaya Siap Hadapi Tantangan Cuaca dan Lapangan di Laga Perdana Super League 2026-2027

Sumbawanews.com,- Persebaya Surabaya akan membuka musim Super League 2026-2027 melawan Bhayangkara Presisi Lampung FC pada Sabtu, 5 September 2026, pukul 15.30 WIB di Stadion PKOR Sumpah Pemuda, Bandar Lampung. Pelatih Bernardo Tavares menyiapkan timnya tidak hanya dari segi taktik, tetapi juga menghadapi tantangan cuaca panas dan kondisi lapangan yang belum pasti. Pertandingan sore hari ini berbeda dari sebagian besar sesi pramusim Persebaya yang lebih sering digelar malam hari, sehingga pelatih asal Portugal itu menyesuaikan jadwal latihan dengan mempercepat sesi latihan untuk membiasakan pemain dengan suhu tinggi.

Tavares mengakui belum memiliki data terbaru mengenai kondisi rumput di Stadion PKOR, namun mengingat pengalaman musim lalu di tempat yang sama, di mana bola sering memantul tidak beraturan, ia memprediksi lapangan bisa menjadi faktor penentu. “Jika lapangan masih seperti itu, tim yang lebih kuat secara fisik dan mampu menang adu second ball akan unggul,” ujarnya, mengutip laman resmi PT Liga Indonesia Baru (I.League) pada 3 September 2026. Ia menekankan bahwa Bhayangkara FC adalah tim yang dikenal tangguh secara fisik, sehingga adaptasi menjadi kunci utama.

Meski Persebaya tengah kehilangan beberapa pemain andalan, Tavares menegaskan bahwa timnya tidak akan bergantung pada kondisi ideal. “Saya tidak tahu kondisi pastinya sekarang, tapi kita harus siap untuk segala kemungkinan—baik lapangan bagus atau buruk,” tegasnya. Kesiapan mental dan fisik menjadi fokus utama menjelang laga pembuka musim baru, setelah sukses meraih gelar Piala Presiden 2026 beberapa bulan lalu.

The post Persebaya Siap Hadapi Tantangan Cuaca dan Lapangan di Laga Perdana Super League 2026-2027 appeared first on Sumbawanews.