Cristiano Ronaldo Gagal Balas Kekalahan, Al Ittihad Ledek Aksi “Contek” di Lapangan

Sumbawanews.com,- Al Ittihad mengalahkan Al Nassr 2-1 dalam lanjutan Saudi Pro League 2026/2027, Minggu (6/9/2026) dini hari WIB, di King Abdullah Sport City, Jeddah. Kekalahan ini sekaligus mengakhiri rekor tak terkalahkan Al Nassr di kompetisi domestik musim ini. Dua gol dari George Ilenikhena pada menit ke-34 dan ke-67 menjadi penentu kemenangan, sementara Angelo Gabriel membalas untuk Al Nassr pada menit ke-52. Cristiano Ronaldo, yang sempat menjadi sorotan usai diduga mengintip catatan taktik lawan, tak mampu membangkitkan timnya meski berusaha keras di babak kedua.

Insiden kontroversial terjadi pada menit ke-82, ketika pemain pengganti Al Ittihad, Rakan Al Kaabi, membawa selembar kertas berisi strategi dari pelatih Jens Wissing dan menyerahkannya kepada bek Danilo. Ronaldo, dari sisi Al Nassr, terlihat mencoba mengintip isi kertas tersebut dari belakang pundak Danilo. Aksi itu terekam kamera dan langsung viral di media sosial, dengan akun @Saudifutbol membagikan cuplikan yang menunjukkan Ronaldo tertawa setelah ketahuan. Namun, upaya tak konvensional itu tak membuahkan hasil—Al Nassr gagal menyamakan kedudukan dan akhirnya menyerah.

Usai laga, media sosial Al Ittihad langsung meledek kekalahan lawan dengan unggahan singkat: “Curang dan tetap kalah.” Kekalahan ini membuat Al Nassr tertahan di posisi dua klasemen dengan 12 poin dari lima pertandingan, sementara Al Ittihad naik ke peringkat empat dengan 11 poin. Meski Ronaldo tetap menjadi pusat perhatian, performa timnya menunjukkan kerapuhan di lini belakang yang tak bisa diatasi oleh individualitas sekalipun.

The post Cristiano Ronaldo Gagal Balas Kekalahan, Al Ittihad Ledek Aksi “Contek” di Lapangan appeared first on Sumbawanews.