PSM Makassar Kecam Kondisi Lapangan Persib, Minta Akses Latihan di Stadion

Sumbawanews.com,- Pelatih PSM Makassar, Darije Kalezic, mengkritik kebijakan baru Super League yang melarang tim tamu melakukan latihan resmi di stadion sehari sebelum pertandingan, sekaligus mempertanyakan kelayakan lapangan Stadion Gelora Bandung Lautan Api menjelang laga melawan Persib. Kalezic menilai akses latihan di lokasi pertandingan adalah hal krusial bagi kesiapan tim, terutama karena PSM yang tak bermarkas di Makassar, melainkan di Parepare—berjarak 150 kilometer—sehingga kesempatan berlatih di stadion pertandingan hampir tak pernah terwujud sepanjang musim.

Dalam pernyataannya, Kalezic menyatakan preferensinya agar klub tamu tetap diberi kesempatan berlatih di stadion pada malam sebelum laga. “Kalau Anda bertanya kepada saya apakah ini bagus atau buruk, saya lebih memilih memberikan hospitality kepada klub tamu untuk berlatih di stadion kami. Bagi kami, penting juga untuk bisa berlatih di stadion pada malam sebelum pertandingan,” ujarnya. Ia menekankan bahwa kondisi ini semakin kritis bagi PSM, yang sejak awal musim harus bertanding di luar kota kandangnya, membuat akses ke lapangan pertandingan menjadi langka.

Meski memahami alasan larangan latihan di lapangan yang kondisinya buruk, Kalezic tak bisa membiarkan kualitas lapangan Stadion Gelora Bandung Lautan Api berlalu tanpa komentar. “Saya bisa memahami bahwa anda tidak bisa berlatih di lapangan ini,” katanya, sebelum menambahkan, “Meski begitu, saya juga tidak mengerti bagaimana kami bisa bermain di lapangan seperti ini.” Ia menilai kondisi rumput dan permukaan lapangan tidak layak untuk pertandingan elite, dan menyerukan perbaikan segera.

Kalezic menegaskan bahwa Persib, sebagai salah satu klub terbesar—bahkan mungkin yang terbesar—di Indonesia, seharusnya memiliki fasilitas lapangan yang sepadan dengan reputasinya. “Saya berharap Persib Bandung memiliki lapangan yang jauh lebih baik, karena Persib Bandung adalah salah satu klub terbesar, mungkin yang terbesar di Indonesia. Saya pikir demi reputasi klub, mereka seharusnya memiliki lapangan yang jauh lebih baik,” pungkasnya.

The post PSM Makassar Kecam Kondisi Lapangan Persib, Minta Akses Latihan di Stadion appeared first on Sumbawanews.