Kalezic Kecewa, Lapangan GBLA Dinilai Tak Layak Main

Sumbawanews.com,- Pelatih PSM Makassar, Darije Kalezic, mengkritik keras kondisi lapangan Stadion Gelora Bandung Lautan Api (GBLA) usai laga melawan Persib Bandung pada pekan pertama Super League 2026/2027, Minggu (6/9/2026). PSM kalah 1-3 dalam pertandingan yang berlangsung di markas Persib itu, namun kekalahan bukan satu-satunya masalah yang menghantui tim tamu. Kalezic menilai permukaan rumput di GBLA tidak layak untuk pertandingan profesional, dengan banyak tambalan dan mudah terkelupas saat pemain melakukan gerakan sliding, berisiko menyebabkan cedera.

Kalezic mempertanyakan bagaimana pertandingan bisa tetap digelar di lapangan dengan kondisi semacam itu. Ia menekankan bahwa Persib Bandung, sebagai salah satu klub terbesar di Indonesia, seharusnya memiliki fasilitas lapangan yang sepadan dengan reputasinya. “Bagaimana kita bisa bermain di lapangan ini? Saya berharap Persib Bandung memiliki lapangan yang jauh lebih baik—demi reputasi klub,” ujarnya.

Kapten PSM, Rizky Eka, juga mengungkapkan dampak nyata dari kondisi lapangan terhadap permainan tim. Menurutnya, rencana taktis berbasis penguasaan bola yang telah dipersiapkan pelatih tidak bisa dijalankan maksimal. Pemain terpaksa melakukan improvisasi di tengah lapangan yang tidak stabil, mengganggu ritme dan konsistensi permainan. “Karena lapangan ini kurang bagus, kami kesulitan menjalankan gaya bermain ball possession yang biasa kami latih,” kata Rizky.

Laga ini menjadi sorotan bukan hanya karena skor, tetapi juga karena kekhawatiran mendalam terhadap standar infrastruktur sepak bola di Indonesia, terutama di kandang klub-klub besar.

The post Kalezic Kecewa, Lapangan GBLA Dinilai Tak Layak Main appeared first on Sumbawanews.